; RESON7kGeneric.def : Declares the module parameters for the DLL.

LIBRARY      "RESON7kGeneric"
DESCRIPTION  'RESON7kGeneric Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
Startup
Shutdown
Identify
Load
SendCommand
GetModuleVersion
RetrieveStatus
RouteMessage
ResetSensor
IsSensorHealthy

