Copyright: Copyright © 2001 Digi International, Inc. All Rights Reserved.
Citation: Copyright © 2001 Digi International, Inc. All Rights Reserved.


Enter MAC Address

Each device with Ethernet connectivity has a unique Ethernet medium access control (MAC) address. The twelve-digit hexadecimal MAC address assigned to your EtherLite is located on a label on the bottom of the device.

Enter the MAC address in the Ethernet Address fields. The first six digits are fixed values; you need to supply only the last six digits.

Example of a MAC Address:

00 A0 E7 21 CB 90


Digi Etherlite Configuration (DgIpServ)

Choose an operation to perform. Each of the following choices opens a specific window to complete the operation:

•	Store IP settings

Choose Store IP settings to assign an IP address, subnet mask, and default gateway to an EtherLite for the first time. Ask your network administrator for this information.

•	Erase IP settings

Choose Erase IP settings to erase IP settings without assigning new ones.

•	Change IP settings

Choose Change IP settings to simultaneously erase and assign new IP settings.

•	Update Firmware

Choose Update Firmware to apply an update you downloaded from the Digi Support Web site (http://support.digi.com).


Assign IP Settings
Assign/Change IP Settings

Enter the IP address, subnet mask, and default gateway you wish to assign to the EtherLite. Use decimal values for each field, with no leading zeros.


Erase IP Settings

If you know the IP address currently assigned to the EtherLite, enter it here using decimal values for each field, with no leading zeros. Otherwise, choose IP Address Unknown.


Configuration Process

This window displays any instructions you must follow to complete the operation you chose. It also displays current status of the operation.