20.4 20.6 20.8 21.0 21.2 21.4 21.6 0

50

100

150

200

250

Time (GMT)

Frequency (Hz)

FOCE-1 CO_2 Kinetics Experiment

127.1 ±1.0

126.7 ±1.4