20.4 20.6 20.8 21.0 21.2 21.4 21.6 0 0.5 1.0 1.5 2.0 2.5

Time (GMT)

Flowrate (L/min)

FOCE-1 CO_2 Kinetics Experiment

1.1052 1.1056

1.1013 1.1014

20.4 20.6 20.8 21.0 21.2 21.4 21.6 0

40

80

120

Time (GMT)

Total Volume (L)

-- realtime data -- postprocessed

17.240

12.789

13.100

9.728

12.789 9.729