230 240 250 260 270 280 290 300 3

4

5

6

7

8

Time (yearday) pH

MARS Test Station 2007

Mean = 4.37 ± 0.13 °C

-- = pH 07 -- = pH 08 -- = pH 13

Temperature ( °C)

8

7

6

5

4

3