4.0 4.2 4.4 4.6 4.8

34.25

34.30

34.35

34.40

34.45

34.50

4.0 4.2 4.4 4.6 4.8 34.25

34.30

34.35

34.40

34.45

34.50

Temperature (°C)

Salinity (pss-78)

MARS Test Station 2007

Mean temp = 4.37 ± 0.13 °C

Mean sal = 34.378 ± 0.016

Mean σ^θ = 27.260 ± 0.024

Range σ^θ = 27.322 - 27.179