15 20 25 30 35 40 45

4.3

4.4

4.5

4.6

4.7

4.8

4.9

GMT (hours)

Temp (°C)

MARS/FOCE CTD Data

--- MARS CTD --- CTD #1 (Int) --- CTD #2 (Amb)