15 20 25 30 35 40 45

34.0

34.1

34.2

34.3

34.4

GMT (hours)

Salinity (pss-78)

MARS/FOCE CTD Data

--- MARS CTD --- CTD #1 (Int) --- CTD #2 (Amb)