0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80

speed (rpm)

Voltage (Volts)

Kt = Kv =

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

0.5

1

1.5

speed (rpm)

Current (Amps)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.1 0.2 0.3 0.4 0.5

speed (rpm)

Torque (N-m)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 -20 -10 0 10 20

speed (rpm)

Power (Watts)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.2 0.4 0.6 0.8 1

speed (rpm)

Efficiency

Windings Load Input