0 200 400 600 800 1000 2 2.5 3 3.5 4 4.5 5 5.5

% Deadspace: [100*(Final Volume)/(Delta Volume)]

Final Pressure (psi)

Final Internal Pressure (20psi initial internal pressure) Adiabatic Isothermal