0 1 2 3 4 5 6 7 8 9 10 0 20 40 60 80 100 120 140 160 180 200

Bore Diameter (in)

Drag Force (lbs)

Piston Seal Drag

0 1 2 3 4 5 6 7 8 9 10

0.92

0.93

0.94

0.95

0.96

0.97

0.98

0.99

1

Bore Diameter (in)

Efficiency

Piston Seal efficiency at 200m depth (300psi)

2-2xx 2-3xx

2-2xx 2-3xx