0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 10 20 30 40 50 60 70

Vel (m/s)

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0

0.2

0.4

0.6

0.8

diam (in) eff

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0 0.1 0.2 0.3 0.4 0.5

diam (in)

Q (lps)

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.2

0.4

0.6

0.8

1

diam (in)

Cd

Computed From Bird Precision

Computed From Bird Precision

Computed From Bird Precision Ideal Fluid

Computed From Bird Precision