Check sensitivity

   A low level signal is applied to check that U9 has gain.
   The pulse on channel 2 of the scope may not be as wide as in the
   previous test.

   Fault finding
   U9 pin 2,3,6 should all be at about half rail but high impedances are
   involved so the impedance of the meter/scope may pull them down.

