area of target (cm^2)

0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5

p value Wilcoxon Mann Whitney comparing distribution of 1 and 2 second readings

0.0 0.1 0.2 0.3 0.4 0.5 target cm2 vs p val WMW 690 target cm2 vs p val WMW590 0.05