10^{-2} 10^{-1} 10^0 10^1 Frequency [cps]

10^{-14}

10^{-12}

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

Spectral Density [(m/s)^2/cps]

CTD 1Hz 2-m binned CTD 1Hz P from MR 64Hz