Depth (m)

16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31

40 60 80 u (cm/s)

-20

0

20

16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31

40 60 80 v (cm/s)

-20 0 20

16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31

40 60 80 w (cm/s)

-2

0

2

Day of time series, starting April 15

16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31

40 60 80 amp (counts)

80 100 120 140 160

MBARI OCCO Program, Shelfbreak ADCP Mooring, April 2003