0 1 2 3 4 5 6 0

50

100

150

Days

H_s (m)

Yearly wave statistics at CDIP 045

0 2 4 6 0 200 400 January - CDIP 045

Hours

0 2 4 6 0 200 400 February - CDIP 045

0 2 4 6 0 200 400 March - CDIP 045

0 2 4 6 0 200 400 April - CDIP 045

0 2 4 6 0 200 400 May - CDIP 045

0 2 4 6 0 200 400 June - CDIP 045

0 2 4 6 0 200 400 July - CDIP 045

0 2 4 6 0 200 400 August - CDIP 045

0 2 4 6 0 200 400 September - CDIP 045

0 2 4 6 0 200 400 October - CDIP 045

0 2 4 6 0 200 400 November - CDIP 045

H_s (m)

0 2 4 6 0 200 400 December - CDIP 045

H_s (m)