0 2 4 6 8 10 0

10

20

30

40

50

60

70

80

90

100

Days

H_s (m)

Yearly wave statistics at CDIP 071 (Harvest, CA)

0 5 10 0 100 200 300 January

Hours

0 5 10 0 100 200 300 February

0 5 10 0 100 200 300 March

0 5 10 0 100 200 300 April

0 5 10 0 100 200 300 May

0 5 10 0 100 200 300 June

0 5 10 0 100 200 300 July

0 5 10 0 100 200 300 August

0 5 10 0 100 200 300 September

0 5 10 0 100 200 300 October

0 5 10 0 100 200 300 November

H_s (m)

0 5 10 0 100 200 300 December

H_s (m)