0 10 20 30 40 50 60 70 80 -20

0

20

40

60

80

100

m m

No ESP, No Stretch Hose ESP In-Line at 15m depth, No Stretch Hose ESP In-Line at 15m depth, 5m Stretch Hose

0 20 40 60 80 100 120 140 200

300

400

500

600

700

800

900

1000

Distance from Anchor along mooring line

Tension (lbs)

No ESP, No Stretch Hose ESP In-Line at 15m depth, No Stretch Hose ESP In-Line at 15m depth, 5m Stretch Hose