10/19 00:00

10/19 01:00

10/19 02:00

10/19 03:00

10/19 04:00

10/19 05:00

2021 Local Time

50

100

150

200

250

300

350

400

450

500

Depth [m]

U ADCP @ M1 during CPF-MR-T4

-0.2

-0.15

-0.1

-0.05

0

0.05

0.1

0.15

0.2 [m/s]